Freud DS1208CFC 12″ x 8TPI Demon Carbide Reciprocating Saw Blade

The Freud 12″ x 8TPI Demon Carbide Reciprocating Saw Blade is a high-performance cutting tool designed for demanding cutting applications. Featuring Freud’s innovative Demon Carbide technology, this blade offers exceptional durability and cutting efficiency. The carbide teeth are engineered to withstand extreme heat and abrasion, ensuring long-lasting sharpness and resistance to wear. With 8 teeth per inch (TPI), this blade is suitable for aggressive cutting tasks in a variety of materials, including wood, metal, and plastics. The unique blade geometry and aggressive tooth design enable fast and efficient cutting, resulting in smoother and cleaner cuts with reduced vibration and blade deflection. Whether for demolition, remodeling, or construction projects, the Freud DS1208CFC provides reliable cutting performance and durability in even the toughest cutting conditions.

The post Freud DS1208CFC 12″ x 8TPI Demon Carbide Reciprocating Saw Blade appeared first on Preston Hardware.