Freud DS0914BGP5C 9″ x 8/14TPI Reciprocating Saw Blade – 5PK

The Freud 9″ x 8/14TPI Reciprocating Saw Blade comes in a convenient pack of five, offering versatility and durability for a range of cutting tasks. These blades feature a bi-metal construction, combining high-speed steel teeth with a flexible alloy steel body, ensuring strength and longevity. With a combination of 8 and 14 teeth per inch (TPI), they provide efficient cutting in both wood and metal materials, making them suitable for various applications. The reinforced tooth design enhances durability and resists tooth strippage, ensuring consistent performance over time. Whether for professional contractors or DIY enthusiasts, these reciprocating saw blades deliver reliable cutting performance and value in a convenient multi-pack.

The post Freud DS0914BGP5C 9″ x 8/14TPI Reciprocating Saw Blade – 5PK appeared first on Preston Hardware.