Freud D1040W 10-1/4″ x 40TPI General Purpose Saw Blade

The Freud 10-1/4″ x 40T General Purpose Saw Blade is a versatile cutting tool designed for various woodworking applications. With 40 teeth per inch (TPI), this blade delivers smooth and clean cuts in a wide range of materials, including hardwood, softwood, plywood, and composite materials. The blade features high-density carbide teeth that ensure durability and long-lasting sharpness, reducing the need for frequent sharpening or replacement. Its anti-vibration design reduces noise and chatter during operation, resulting in more precise and accurate cuts. The laser-cut expansion slots help dissipate heat and reduce blade warp, extending the blade’s lifespan. Whether for crosscutting or ripping tasks, the Freud D1040W is an excellent choice for both professional woodworkers and DIY enthusiasts seeking reliable and efficient cutting performance.

The post Freud D1040W 10-1/4″ x 40TPI General Purpose Saw Blade appeared first on Preston Hardware.