Freud DS0614BFCC 6″ x 14/18TPI Reciprocating Saw Blade

The Freud 6″ x 14/18T Reciprocating Saw Blade is a high-performance cutting tool designed for efficient and precise cutting in various materials. Featuring a bi-metal construction, this blade offers durability and longevity, making it suitable for demanding applications. The 14/18 teeth per inch (TPI) configuration provides versatility, allowing the blade to cut through both thick and thin materials with ease. Whether cutting wood, metal, or plastic, this reciprocating saw blade delivers fast and smooth cuts. The reinforced tooth design enhances durability and resists tooth strippage, ensuring consistent performance over time. With its advanced engineering and high-quality materials, the Freud DS0614BFCC is a reliable choice for professionals and DIYers alike

The post Freud DS0614BFCC 6″ x 14/18TPI Reciprocating Saw Blade appeared first on Preston Hardware.