Freud CD0706H 7-1/4″ x 6TPI Fiber Cement Saw Blade

The Freud 7-1/4″ x 6TPI Fiber Cement Saw Blade is a specialized cutting tool designed for efficient and precise cutting of fiber cement materials. With its 6 teeth per inch (TPI) configuration, this blade delivers smooth and clean cuts in fiber cement boards, siding, and other similar materials. The blade is constructed with durable carbide teeth that ensure long-lasting performance and resistance to wear. Its non-stick Perma-SHIELD coating reduces friction and heat buildup, preventing gumming and corrosion, and prolonging the blade’s lifespan. This 7-1/4″ saw blade is compatible with most circular saws, making it suitable for both professional contractors and DIY enthusiasts working on fiber cement projects.

The post Freud CD0706H 7-1/4″ x 6TPI Fiber Cement Saw Blade appeared first on Preston Hardware.