Freud DS0914BF5C 9″ x 14/18TPI Reciprocating Saw Blade – 5PK

The Freud 9″ x 14/18T Reciprocating Saw Blade is a versatile and durable cutting solution, offered in a convenient pack of five. These blades are designed for efficient and precise cutting in various materials, including wood, metal, and plastic. With a bi-metal construction, they offer exceptional durability and longevity, making them suitable for demanding applications. The 14/18 teeth per inch (TPI) configuration provides versatility, allowing the blades to cut through both thick and thin materials with ease. The reinforced tooth design enhances durability and resists tooth strippage, ensuring consistent performance over time. Whether for professional use or DIY projects, the Freud DS0914BF5C offers reliable cutting performance and value in a convenient multi-pack.

The post Freud DS0914BF5C 9″ x 14/18TPI Reciprocating Saw Blade – 5PK appeared first on Preston Hardware.