Freud D0860X 8-1/4″ x 60T Fine Finish Saw Blade

Diablo’s Fine Finish Saw Blades for Wood offer the quality that fine cabinetmakers expect with the capability to handle the extreme conditions and portability needed on professional construction jobsites. These blades are the perfect choice for excellent rips and crosscuts using a portable saw. The combination of Diablo’s application specific TiCo Hi-Density carbide teeth and a super thin-kerf blade produces a remarkably clean, chip-free cut that requires little to no sanding. An excellent choice for fine finish cuts in oak, pine, melamine, veneered plywood, and molding.

The post Freud D0860X 8-1/4″ x 60T Fine Finish Saw Blade appeared first on Preston Hardware.