Freud DS0912W5C 9″ x 6/12TPI Reciprocating Bi-Metal Blade – 5PK

The Freud 9″ x 6/12TPI Reciprocating Bi-Metal Blade is a versatile cutting solution offered in a convenient pack of five. These blades feature a bi-metal construction, combining high-speed steel teeth with a flexible alloy steel body, ensuring durability and longevity. With a combination of 6 and 12 teeth per inch (TPI), they provide efficient cutting in a wide range of materials, including wood, metal, and plastic. The reinforced tooth design enhances durability and resists tooth strippage, ensuring consistent performance over time. Whether for professional contractors or DIY enthusiasts, these reciprocating saw blades deliver reliable cutting performance and value in a convenient multi-pack.

The post Freud DS0912W5C 9″ x 6/12TPI Reciprocating Bi-Metal Blade – 5PK appeared first on Preston Hardware.