Freud DHS Bi-Metal Holesaw

The Freud DHS Bi-Metal Holesaw series offers a range of versatile cutting tools designed for drilling large diameter holes in various materials. With their bi-metal construction, these holesaws provide durability and toughness, making them suitable for cutting through wood, metal, plastic, and other materials encountered in construction, plumbing, electrical, and HVAC work. Available in various sizes, the DHS Bi-Metal Holesaws accommodate different hole diameters, allowing for flexibility in application. The teeth are precision-ground and hardened to withstand the rigors of cutting through tough materials, ensuring clean and accurate cuts. Whether for professional use or DIY projects, the Freud DHS Bi-Metal Holesaws deliver reliable cutting performance and versatility for a wide range of drilling applications.

The post Freud DHS Bi-Metal Holesaw appeared first on Preston Hardware.